\input texinfo  @c -*-texinfo-*-
@comment %**start of header (This is for running Texinfo on a region.)
@setfilename dbag
@settitle ECG Database Applications Guide
@setchapternewpage odd
@comment %**end of header (This is for running Texinfo on a region.)

@titlepage
@sp 5
@center @titlefont{ECG Database Applications Guide}
@sp 4
@center Tenth Edition
@center @today
@sp 5
@center George B. Moody
@sp 1
@center Harvard-MIT Division of Health Sciences and Technology
@center Biomedical Engineering Center
@page
@vskip 0pt plus 1filll
Copyright @copyright{} 1992 -- 1997 Massachusetts Institute of Technology.
@sp 2
For information on obtaining the most recent versions of the software
described in this guide, visit @code{http://ecg.mit.edu}, or write to:

@display
MIT-BIH Database Distribution
Massachusetts Institute of Technology
77 Massachusetts Avenue, Room 20A-113
Cambridge, MA 02139
USA
@end display

An HTML version of this guide is available;  point your web browser to
@code{http://ecg.mit.edu/dbag/} to view it.
Additional printed copies of this guide are available for US$10 each
(including shipping by surface mail) by writing to the address above.
Please make checks payable to ``Beth Israel Hospital Biomedical
Engineering Division.''


@sp 2
Permission is granted to make and distribute verbatim copies of this
guide provided that the copyright notice and this permission notice are
preserved on all copies.

Permission is granted to copy and distribute modified versions of this
guide under the conditions for verbatim copying, provided also that the
entire resulting derived work is distributed under the terms of a
permission notice identical to this one.

Permission is granted to copy and distribute translations of this guide
into another language, under the above conditions for modified versions.
@end titlepage
@bye
